<!--
  - SomeTestComponent.vue
  - Copyright (c) 2019 james@firefly-iii.org
  -
  - This file is part of Firefly III (https://github.com/firefly-iii).
  -
  - This program is free software: you can redistribute it and/or modify
  - it under the terms of the GNU Affero General Public License as
  - published by the Free Software Foundation, either version 3 of the
  - License, or (at your option) any later version.
  -
  - This program is distributed in the hope that it will be useful,
  - but WITHOUT ANY WARRANTY; without even the implied warranty of
  - MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
  - GNU Affero General Public License for more details.
  -
  - You should have received a copy of the GNU Affero General Public License
  - along with this program.  If not, see <https://www.gnu.org/licenses/>.
  -->

<template>
  <div class="container">
    <div class="row">
      <div class="col-md-8 col-md-offset-2">
        <div class="panel panel-default">
          <div class="panel-heading">Test Component</div>

          <div class="panel-body">
            <p>{{ $t("firefly.welcome_back") }}</p>
          </div>
        </div>
      </div>
    </div>
  </div>
</template>

<script>
export default {
  mounted() {
    // console.log('Component mounted.')
  }
}
</script>
